#S #S

#S

#S

#S #S #S #S

#S

#S

#S

#S #S^{#S}

#S

#S

#S

#S

#S

#S

#S

#S

#S

$ Ed

HW IC

Cam

KCL

Liv

Man NCL

QMW

UCL

Bham

York

Leeds

Soton

Durham

Napier

Strath

Bristol

Glasgow

Reading

Warwick

Stirling

Sheffield

Short Range Web Scan - 100 Scale

# Web Site (Each guide ring is 10 WebX Units wide.)

$ Oxford

Bham - Birmingham Cam - Cambridge Ed - Edinburgh HW - Heriot- Watt IC - Imperial College KCL - Kings College London Liv - Liverpool Man - Manchester NCL - Newcastle QMW - Queen Mary & Westfield College Soton - Southampton Strath - Strathclyde UCL - University College London