# # ### ##

# # # #

#

#

#

#

#

#

#

#

#

#

#

#

# ## #

#

#

#

#

# # # # # ## #

#

##

#

#

# #

#

#

#

#

# #

#

#

#

# # #

#

#

#

# #

#

## # ### # # # # ##

#

#

#

#

# #

#

# # # # #

#

##

#

#

# #

#

# #

# # # # # ##

# # # #

#

#

#

#

#

#

#$

# Web Site (Each guide ring is 1,000 WebX Units wide.)

$ Oxford

Long Range Web Scan - 10,000 Scale